INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (10979, 'EPSG', 10979, '+proj=lcc +lat_1=28 +lat_0=28 +lon_0=-90 +k_0=0.9996 +x_0=1600200 +y_0=533400 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["NATRF2022 / Gulf",GEOGCS["NATRF2022",DATUM["North_American_Terrestrial_Reference_Frame_of_2022",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","10968"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",28],PARAMETER["central_meridian",-90],PARAMETER["scale_factor",0.9996],PARAMETER["false_easting",1600200],PARAMETER["false_northing",533400],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AUTHORITY["EPSG","10979"]]');