INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (10981, 'EPSG', 10981, '+proj=lcc +lat_1=30 +lat_0=30 +lon_0=-91.3333333333333 +k_0=0.9999165 +x_0=609610.287 +y_0=147761.325 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=ft +no_defs +type=crs', 'PROJCS["NATRF2022 / Gulf Louisiana Shelf (ft)",GEOGCS["NATRF2022",DATUM["North_American_Terrestrial_Reference_Frame_of_2022",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","10968"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",30],PARAMETER["central_meridian",-91.3333333333333],PARAMETER["scale_factor",0.9999165],PARAMETER["false_easting",2000033.75],PARAMETER["false_northing",484781.25],UNIT["foot",0.3048],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","10981"]]');