INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (10982, 'EPSG', 10982, '+proj=lcc +lat_1=29.3325 +lat_0=29.3325 +lon_0=-99 +k_0=0.9998499 +x_0=609633.909 +y_0=166114.095 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=ft +no_defs +type=crs', 'PROJCS["NATRF2022 / Gulf Texas Shelf North (ft)",GEOGCS["NATRF2022",DATUM["North_American_Terrestrial_Reference_Frame_of_2022",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","10968"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",29.3325],PARAMETER["central_meridian",-99],PARAMETER["scale_factor",0.9998499],PARAMETER["false_easting",2000111.25],PARAMETER["false_northing",544993.75],UNIT["foot",0.3048],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","10982"]]');