INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (10983, 'EPSG', 10983, '+proj=lcc +lat_1=27 +lat_0=27 +lon_0=-98.5 +k_0=0.9998844 +x_0=609630.48 +y_0=147679.41 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=ft +no_defs +type=crs', 'PROJCS["NATRF2022 / Gulf Texas Shelf South (ft)",GEOGCS["NATRF2022",DATUM["North_American_Terrestrial_Reference_Frame_of_2022",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","10968"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",27],PARAMETER["central_meridian",-98.5],PARAMETER["scale_factor",0.9998844],PARAMETER["false_easting",2000100],PARAMETER["false_northing",484512.5],UNIT["foot",0.3048],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","10983"]]');