INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2100, 'EPSG', 2100, '+proj=tmerc +lat_0=0 +lon_0=24 +k=0.9996 +x_0=500000 +y_0=0 +ellps=GRS80 +towgs84=-199.87,74.79,246.62,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["GGRS87 / Greek Grid",GEOGCS["GGRS87",DATUM["Greek_Geodetic_Reference_System_1987",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[-199.87,74.79,246.62,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4121"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",0],PARAMETER["central_meridian",24],PARAMETER["scale_factor",0.9996],PARAMETER["false_easting",500000],PARAMETER["false_northing",0],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","2100"]]');