INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2234, 'EPSG', 2234, '+proj=lcc +lat_0=40.8333333333333 +lon_0=-72.75 +lat_1=41.8666666666667 +lat_2=41.2 +x_0=304800.609601219 +y_0=152400.30480061 +ellps=GRS80 +nadgrids=us_noaa_njhpgn.tif +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83 / Connecticut (ftUS)",GEOGCS["NAD83",DATUM["North_American_Datum_1983",SPHEROID["GRS 1980",6378137,298.257222101],EXTENSION["PROJ4_GRIDS","us_noaa_njhpgn.tif"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4269"]],PROJECTION["Lambert_Conformal_Conic_2SP"],PARAMETER["latitude_of_origin",40.8333333333333],PARAMETER["central_meridian",-72.75],PARAMETER["standard_parallel_1",41.8666666666667],PARAMETER["standard_parallel_2",41.2],PARAMETER["false_easting",1000000],PARAMETER["false_northing",500000],UNIT["US survey foot",0.304800609601219],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","2234"]]');