INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (3086, 'EPSG', 3086, '+proj=aea +lat_0=24 +lon_0=-84 +lat_1=24 +lat_2=31.5 +x_0=400000 +y_0=0 +ellps=GRS80 +nadgrids=us_noaa_schpgn.tif +units=m +no_defs +type=crs', 'PROJCS["NAD83 / Florida GDL Albers",GEOGCS["NAD83",DATUM["North_American_Datum_1983",SPHEROID["GRS 1980",6378137,298.257222101],EXTENSION["PROJ4_GRIDS","us_noaa_schpgn.tif"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4269"]],PROJECTION["Albers_Conic_Equal_Area"],PARAMETER["latitude_of_center",24],PARAMETER["longitude_of_center",-84],PARAMETER["standard_parallel_1",24],PARAMETER["standard_parallel_2",31.5],PARAMETER["false_easting",400000],PARAMETER["false_northing",0],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","3086"]]');