INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (3161, 'EPSG', 3161, '+proj=lcc +lat_0=0 +lon_0=-85 +lat_1=44.5 +lat_2=53.5 +x_0=930000 +y_0=6430000 +ellps=GRS80 +nadgrids=us_noaa_cnhpgn.tif +units=m +no_defs +type=crs', 'PROJCS["NAD83 / Ontario MNR Lambert",GEOGCS["NAD83",DATUM["North_American_Datum_1983",SPHEROID["GRS 1980",6378137,298.257222101],EXTENSION["PROJ4_GRIDS","us_noaa_cnhpgn.tif"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4269"]],PROJECTION["Lambert_Conformal_Conic_2SP"],PARAMETER["latitude_of_origin",0],PARAMETER["central_meridian",-85],PARAMETER["standard_parallel_1",44.5],PARAMETER["standard_parallel_2",53.5],PARAMETER["false_easting",930000],PARAMETER["false_northing",6430000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","3161"]]');