INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (3968, 'EPSG', 3968, '+proj=lcc +lat_0=36 +lon_0=-79.5 +lat_1=37 +lat_2=39.5 +x_0=0 +y_0=0 +ellps=GRS80 +nadgrids=us_noaa_WO.tif +units=m +no_defs +type=crs', 'PROJCS["NAD83 / Virginia Lambert",GEOGCS["NAD83",DATUM["North_American_Datum_1983",SPHEROID["GRS 1980",6378137,298.257222101],EXTENSION["PROJ4_GRIDS","us_noaa_WO.tif"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4269"]],PROJECTION["Lambert_Conformal_Conic_2SP"],PARAMETER["latitude_of_origin",36],PARAMETER["central_meridian",-79.5],PARAMETER["standard_parallel_1",37],PARAMETER["standard_parallel_2",39.5],PARAMETER["false_easting",0],PARAMETER["false_northing",0],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","3968"]]');